DROP TABLE IF EXISTS `SCT_RESOURCE_SET_NAME`;
CREATE TABLE `SCT_RESOURCE_SET_NAME` (
  `UUID` varchar(64) NOT NULL DEFAULT '',
  `NAME` varchar(255) DEFAULT NULL,
  PRIMARY KEY (`UUID`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4;

DROP TABLE IF EXISTS `SCT_RESOURCE_MAPPING`;
CREATE TABLE `SCT_RESOURCE_MAPPING` (
  `SET_UUID` varchar(64) DEFAULT NULL,
  `RESOURCE_UUID` varchar(64) DEFAULT NULL
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4;