ALTER TABLE SCT_USER ADD `REMARKS` longtext ;





ALTER TABLE `SCT_USER`
ADD COLUMN `SAFEWORD`  varchar(32) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL AFTER `USERNAME`;

